Wed Sep 19 09:38:00 2001

Rosenbrock Function

3D mesh plot

X Y

Z

z

0.1262 10 20 30 40 50 60 70 80 90 100

v

-2 -1 0 1 2 3 4

u

-3 -2 -1 0 1 2 3